RV Group Services (RVG Commercial Cleaning) is a commercial cleaning company based in Melbourne-Victoria and servicing a range of clients throughout Victoria. We are proud to be experts in our field, specialising in office cleaning, commercial cleaning, industrial cleaning, medical centre cleaning and hospitality cleaning.